Realogic Startup/Shutdown Screens

More great stuff at:

http://www.mm.com/realogic

AUTOMATIC

MANUALLY INSTALLING START-UP SCREEN

MANUALLY INSTALLING SHUTDOWN SCREEN

If You Have Problems


AUTOMATIC
AUTOMATIC:

Run 'setup'.bat by clicking on it in Explorer or at a DOS prompt. This will make a directory called c:\windows\realscreens & move your original screens there.

If you decide you don't want to  use these screens run 'unscrns.bat'. This will delete these screens & reinstall your original screens.


MANUALLY INSTALLING START-UP SCREEN
MANUALLY INSTALLING START-UP SCREEN:

 (The following assumes that your boot directory is C:\  and your Windows directory is C:\WINDOWS)

1. To install this file back up your old c:\logo.sys file, if you have this file. (Win95 uses a default screen that is built into io.sys.) If there is a file called logo.sys then this will be used instead. Some other programs install such a file.

2. Copy this logo.sys to c:

3. When you next boot up you will have the new screen.


MANUALLY INSTALLING SHUTDOWN SCREEN
MANUALLY INSTALLING SHUTDOWN SCREEN:

1. To install these files, back up your old c:\windows\logow.sys  and c:\windows\logos.sys file.

2. Copy the new logow.sys and logos.sys to c:\windows

3. When you next shutdown your computer up you will have these screens.


Problems You May Experience
Problems You May Experience-

You may be unable to see logo.sys & logow.sys.  To solve this, in explorer go to the View|Options menu  & under Hidden Files click on Show All Files.

As an alternative, you can open a DOS window & copy the files with the DOS copy command.

For a lot more freebies, visit

http://www.mm.com/realogic